//--------------------------------------------------------------
//Package Script Path
//	Upon starting the game, the specified package script will be run.
//package.script.main = script/ExRumia/ExRumia_Package_Main.txt

//--------------------------------------------------------------
//Window Title
//	The text to display on the window title.
//window.title = ExRumia Package

//--------------------------------------------------------------
//Screen Size
//	The default size is 640x480, use these parameters to change the screen size.
//	Minimum and maximum size is 320x240 and 1920x1200 respectively.
screen.width  = 1920
screen.height = 1080

//--------------------------------------------------------------
//Window Size List
//	The sizes that will be listed in config.exe's Window Size drop-down panel.
//	Separated with whitespaces or incorrect size formats.
window.size.list = 960x540 1280x720 1920x1080

//--------------------------------------------------------------
//Skip Mode Speed
//	The speed multiplier of the skip mode. (Triggered while Left CTRL is held down by default.)
//	Limited between 1 and 50.
skip.rate = 20

//--------------------------------------------------------------
//Enable/Disable Unfocused Processing
//	When set to true, enables the engine to continue running in the background
//		even if the user has clicked off the window, or if the window is minimized.
//	Also enables notifications of EV_APP_LOSE_FOCUS and EV_APP_RESTORE_FOCUS.
unfocused.processing = false